<script setup lang="ts">
import xmlInputFieldComponent from '@/components/xml/XmlInputFieldComponent.vue';
import xmlOutputFieldComponent from '@/components/xml/XmlOutputFieldComponent.vue';
import TooltipComponent from '@/components/xml/tooltips/TooltipComponent.vue';
import { ref } from 'vue';


const xml = ref('');
const query = ref('');
const version = ref('');

function updateVersion(newVersion: string) {
    version.value = newVersion;
}
</script>

<template>
    <div id="layout" class="flex flex-col lg:flex-row w-full h-full">
        <div class="flex flex-col lg:flex-row w-full lg:w-7/12 grow overflow-hide px-2">
            <div class="flex flex-col w-full lg:w-1/2 h-2/3 lg:h-full flex-none items-center">
            <xmlInputFieldComponent stylized-name="XML" @update="(data) => {xml = data}"></xmlInputFieldComponent>
            <xmlInputFieldComponent stylized-name="XSLT" @update="(data) => {query = data}"></xmlInputFieldComponent>
        </div>
        <xmlOutputFieldComponent tool="xslt" :xml="xml" :query="query" @update="(version) => updateVersion(version)"></xmlOutputFieldComponent>
        </div>
        <TooltipComponent tool-type="xslt" :version="version"></TooltipComponent>
    </div>
</template>